From 0d64ae3fe33663d5ee536a53d15b21763b73e488 Mon Sep 17 00:00:00 2001
From: Florian Bruhin <me@the-compiler.org>
Date: Sun, 17 Jan 2021 13:18:41 +0100
Subject: Finish dropping PyPEG2

Closes #1161
---
 README.asciidoc | 1 -
 1 file changed, 1 deletion(-)

(limited to 'README.asciidoc')

diff --git a/README.asciidoc b/README.asciidoc
index a4fc38e7d..787ee049a 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -92,7 +92,6 @@ The following software and libraries are required to run qutebrowser:
   for Python 3
 * https://pypi.python.org/pypi/setuptools/[pkg_resources/setuptools] (being
   phased out for qutebrowser v2.0.0)
-* https://fdik.org/pyPEG/[pyPEG2]
 * http://jinja.pocoo.org/[jinja2]
 * http://pygments.org/[pygments]
 * https://github.com/yaml/pyyaml[PyYAML]
-- 
cgit v1.2.3-54-g00ecf

